\documentclass[10pt]{beamer}

\usepackage{ucs}
\usepackage[utf8]{inputenc}
%\usepackage{beamerthemebars}

%\usepackage{babel}
\usepackage{fontenc}
\usepackage{graphicx}

\date{01/12/15}

\date{12/25/14}
\input{/home/svoboda/GOLEM/GWlocal/SW/Latex/commons/LocalGWinput.page}


\def\slide#1#2{\begin{frame}{#1}\begin{center}#2\end{center}\end{frame}}
\def\GWquot#1#2{\begin{quotation}#1\end{quotation}\begin{flushright}\footnotesize #2\end{flushright}}
\def\GWigfw#1{\GWig{width=\tw}{#1}}
\def\GWigex#1{\GWig{width=0.9\tw}{#1}\\ \input{|"exiv2 -Pt -g Exif.Image.ImageDescription /GW/#1 "}}
 

\AtBeginSection{\frame{\sectionpage}}

\begin{document}
\title{VA characteristics @GOLEM}
\author{Vojtech Svoboda Jan Stockel}
\institute{FNSPE CTU Prague}
\date{2015}

\frame{\titlepage}
 
\slide{Experimental setup}{\GWig{width=0.6\tw}{Experiments/EdgePlasmaPhysics/ParticleFlux/RakeProbe/1114ShotToShotMeasurement/Reports/latexrsrcs/setup/expsetup.png}}
\slide{Reference discharge \#17743}{\GWigfw{Experiments/EdgePlasmaPhysics/ParticleFlux/RakeProbe/1114ShotToShotMeasurement/Sessions/1114Intro/Figures/17743/graphpres.png}} 
\slide{Raw signals: electron \& ion signal}{\GWigfw{Experiments/EdgePlasmaPhysics/ParticleFlux/RakeProbe/1114ShotToShotMeasurement/Reports/latexrsrcs/figures/twosignals/graph.jpg}}
\slide{Raw signals alltogether}{\GWig{width=0.8\tw}{Experiments/EdgePlasmaPhysics/ParticleFlux/RakeProbe/1114ShotToShotMeasurement/Sessions/1114Intro/Figures/StandardPlasmaV_bias_scan/graph.jpg}\flushright{Let's make cut @17ms \& @18ms $\rightarrow$ }}
\slide{VA characteristics}{\GWigfw{Experiments/EdgePlasmaPhysics/ParticleFlux/RakeProbe/1114ShotToShotMeasurement/Reports/latexrsrcs/figures/crossplots/graph.jpg}}
\slide{Discharge reproducibility @GOLEM}{\GWig{width=\tw}{Experiments/EdgePlasmaPhysics/ParticleFlux/RakeProbe/1114ShotToShotMeasurement/Sessions/1114Intro/Figures/StandardPlasmaI_p_scan/graph.jpg}}
\slide{LP theory - use 3 parameter fit }{\GWig{width=.8\tw}{Experiments/EdgePlasmaPhysics/ParticleFlux/RakeProbe/1114ShotToShotMeasurement/Reports/latexrsrcs/theory/LPbasics/FurnoPresHowExtractPlasmaPars.jpg}\flushright{Furno et al.:Theory of electrostatic probes}}
\slide{LP theory - empirical parametrization }{$$I(a,V_{bias})=\exp[a_1 \tanh{(V_{bias}+a_2)/a_3}]+a_4 $$\GWig{width=\tw}{Experiments/EdgePlasmaPhysics/ParticleFlux/RakeProbe/1114ShotToShotMeasurement/Reports/latexrsrcs/theory/LPbasics/AzoozScreenShot1.jpg}\flushright{Azzoz@RevSciInst(2008) + code@matlab}}
\slide{Empirical parametrization on the GOLEM data}{\GWig{width=0.9\tw}{Experiments/EdgePlasmaPhysics/ParticleFlux/RakeProbe/1114ShotToShotMeasurement/Reports/latexrsrcs/figures/VAsignalWithAzzozFit.jpg}}
\slide{Extracted parameters}{
\begin{minipage}{0.3\tw}                             
\GWig{width=\tw}{Experiments/EdgePlasmaPhysics/ParticleFlux/RakeProbe/1114ShotToShotMeasurement/Reports/latexrsrcs/figures/VAsignalWithAzzozFit.jpg}
\end{minipage}
\begin{minipage}{0.68\tw}                             
\GWinput{Experiments/EdgePlasmaPhysics/ParticleFlux/RakeProbe/1114ShotToShotMeasurement/Reports/latexrsrcs/theory/EmpiricalAzzoz/parametersPartI.page}
\end{minipage}
\GWinput{Experiments/EdgePlasmaPhysics/ParticleFlux/RakeProbe/1114ShotToShotMeasurement/Reports/latexrsrcs/theory/EmpiricalAzzoz/parametersPartII.page}
}
\slide{LP theory - EEDF }{\GWig{width=.8\tw}{Experiments/EdgePlasmaPhysics/ParticleFlux/RakeProbe/1114ShotToShotMeasurement/Reports/latexrsrcs/theory/EEDF/FurnoEEDFbaseII.jpg}\flushright{Furno et al.:Theory of electrostatic probes}}
\slide{The second derivative of VA characteristics}{\GWigfw{Experiments/EdgePlasmaPhysics/ParticleFlux/RakeProbe/1114ShotToShotMeasurement/Reports/latexrsrcs/figures/d2f.jpg}}
\slide{Final video frame}{\GWigfw{Experiments/EdgePlasmaPhysics/ParticleFlux/RakeProbe/1114ShotToShotMeasurement/Sessions/1114Intro/Analysis/Figs/18000.jpg}\\ \href{https://www.youtube.com/watch?v=yd54Cy2tFT4}{https://www.youtube.com/watch?v=yd54Cy2tFT4}}
\slide{Signal vanish}{\GWigfw{ShowRooms/Diagnostics/RakeProbe/11405.png}}
\slide{Summary}{\bi \im VA characterictic measured on the shot to shot base \im unique data obtained \ei}
\end{document}
