\def\icons{
LhsLhref{/Experiments/HTS/HTSswitch/II/PhotoGallery/CIMG0158.JPG}{LhsLincludegraphics{/Experiments/HTS/HTSswitch/II/PhotoGallery/icons150/CIMG0158.JPG}}
LhsLhref{/Experiments/HTS/HTSswitch/II/PhotoGallery/CIMG0159.JPG}{LhsLincludegraphics{/Experiments/HTS/HTSswitch/II/PhotoGallery/icons150/CIMG0159.JPG}}
LhsLhref{/Experiments/HTS/HTSswitch/II/PhotoGallery/CIMG0160.JPG}{LhsLincludegraphics{/Experiments/HTS/HTSswitch/II/PhotoGallery/icons150/CIMG0160.JPG}}
LhsLhref{/Experiments/HTS/HTSswitch/II/PhotoGallery/CIMG0161.JPG}{LhsLincludegraphics{/Experiments/HTS/HTSswitch/II/PhotoGallery/icons150/CIMG0161.JPG}}
LhsLhref{/Experiments/HTS/HTSswitch/II/PhotoGallery/CIMG0162.JPG}{LhsLincludegraphics{/Experiments/HTS/HTSswitch/II/PhotoGallery/icons150/CIMG0162.JPG}}
LhsLhref{/Experiments/HTS/HTSswitch/II/PhotoGallery/CIMG0163.JPG}{LhsLincludegraphics{/Experiments/HTS/HTSswitch/II/PhotoGallery/icons150/CIMG0163.JPG}}
LhsLhref{/Experiments/HTS/HTSswitch/II/PhotoGallery/CIMG0164.JPG}{LhsLincludegraphics{/Experiments/HTS/HTSswitch/II/PhotoGallery/icons150/CIMG0164.JPG}}
LhsLhref{/Experiments/HTS/HTSswitch/II/PhotoGallery/CIMG0165.JPG}{LhsLincludegraphics{/Experiments/HTS/HTSswitch/II/PhotoGallery/icons150/CIMG0165.JPG}}
LhsLhref{/Experiments/HTS/HTSswitch/II/PhotoGallery/CIMG0170.JPG}{LhsLincludegraphics{/Experiments/HTS/HTSswitch/II/PhotoGallery/icons150/CIMG0170.JPG}}
LhsLhref{/Experiments/HTS/HTSswitch/II/PhotoGallery/CIMG0171.JPG}{LhsLincludegraphics{/Experiments/HTS/HTSswitch/II/PhotoGallery/icons150/CIMG0171.JPG}}
LhsLhref{/Experiments/HTS/HTSswitch/II/PhotoGallery/graf_1.png}{LhsLincludegraphics{/Experiments/HTS/HTSswitch/II/PhotoGallery/icons150/graf_1.png}}
LhsLhref{/Experiments/HTS/HTSswitch/II/PhotoGallery/graf_2.png}{LhsLincludegraphics{/Experiments/HTS/HTSswitch/II/PhotoGallery/icons150/graf_2.png}}
LhsLhref{/Experiments/HTS/HTSswitch/II/PhotoGallery/scheme_sc.jpg}{LhsLincludegraphics{/Experiments/HTS/HTSswitch/II/PhotoGallery/icons150/scheme_sc.jpg}}
}
\def\figs{
LhsLsubsection{CIMG0158.JPG}

LhsLhref{/Experiments/HTS/HTSswitch/II/PhotoGallery/CIMG0158.JPG}{LhsLincludegraphics{/Experiments/HTS/HTSswitch/II/PhotoGallery/resized700/CIMG0158.JPG}}

LhsLsubsection{CIMG0159.JPG}

LhsLhref{/Experiments/HTS/HTSswitch/II/PhotoGallery/CIMG0159.JPG}{LhsLincludegraphics{/Experiments/HTS/HTSswitch/II/PhotoGallery/resized700/CIMG0159.JPG}}

LhsLsubsection{CIMG0160.JPG}

LhsLhref{/Experiments/HTS/HTSswitch/II/PhotoGallery/CIMG0160.JPG}{LhsLincludegraphics{/Experiments/HTS/HTSswitch/II/PhotoGallery/resized700/CIMG0160.JPG}}

LhsLsubsection{CIMG0161.JPG}

LhsLhref{/Experiments/HTS/HTSswitch/II/PhotoGallery/CIMG0161.JPG}{LhsLincludegraphics{/Experiments/HTS/HTSswitch/II/PhotoGallery/resized700/CIMG0161.JPG}}

LhsLsubsection{CIMG0162.JPG}

LhsLhref{/Experiments/HTS/HTSswitch/II/PhotoGallery/CIMG0162.JPG}{LhsLincludegraphics{/Experiments/HTS/HTSswitch/II/PhotoGallery/resized700/CIMG0162.JPG}}

LhsLsubsection{CIMG0163.JPG}

LhsLhref{/Experiments/HTS/HTSswitch/II/PhotoGallery/CIMG0163.JPG}{LhsLincludegraphics{/Experiments/HTS/HTSswitch/II/PhotoGallery/resized700/CIMG0163.JPG}}

LhsLsubsection{CIMG0164.JPG}

LhsLhref{/Experiments/HTS/HTSswitch/II/PhotoGallery/CIMG0164.JPG}{LhsLincludegraphics{/Experiments/HTS/HTSswitch/II/PhotoGallery/resized700/CIMG0164.JPG}}

LhsLsubsection{CIMG0165.JPG}

LhsLhref{/Experiments/HTS/HTSswitch/II/PhotoGallery/CIMG0165.JPG}{LhsLincludegraphics{/Experiments/HTS/HTSswitch/II/PhotoGallery/resized700/CIMG0165.JPG}}

LhsLsubsection{CIMG0170.JPG}

LhsLhref{/Experiments/HTS/HTSswitch/II/PhotoGallery/CIMG0170.JPG}{LhsLincludegraphics{/Experiments/HTS/HTSswitch/II/PhotoGallery/resized700/CIMG0170.JPG}}

LhsLsubsection{CIMG0171.JPG}

LhsLhref{/Experiments/HTS/HTSswitch/II/PhotoGallery/CIMG0171.JPG}{LhsLincludegraphics{/Experiments/HTS/HTSswitch/II/PhotoGallery/resized700/CIMG0171.JPG}}

LhsLsubsection{graf_1.png}

LhsLhref{/Experiments/HTS/HTSswitch/II/PhotoGallery/graf_1.png}{LhsLincludegraphics{/Experiments/HTS/HTSswitch/II/PhotoGallery/resized700/graf_1.png}}

LhsLsubsection{graf_2.png}

LhsLhref{/Experiments/HTS/HTSswitch/II/PhotoGallery/graf_2.png}{LhsLincludegraphics{/Experiments/HTS/HTSswitch/II/PhotoGallery/resized700/graf_2.png}}

LhsLsubsection{scheme_sc.jpg}

LhsLhref{/Experiments/HTS/HTSswitch/II/PhotoGallery/scheme_sc.jpg}{LhsLincludegraphics{/Experiments/HTS/HTSswitch/II/PhotoGallery/resized700/scheme_sc.jpg}}

}
