\include{base/defs}
\head


\def\slide#1#2#3{\begin{frame}[label=#1]\frametitle{#2} #3\end{frame}}
\def\Hheslo#1{\centering{\Huge \bf {#1}}}
\def\Lheslo#1{\centering{\Large \bf {#1}}}
\newcommand{\incl}[1]{#1}
\newcommand{\nincl}[1]{#1}

\begin{document}
\title{The GOLEM experimental setup}
\author{Vojt\v{e}ch Svoboda \& the GOLEM team}
\date{\today}
\slide{title}{The GOLEM documentation collection}{\titlepage}
\toc

\AtBeginSection[]
{
   \begin{frame}
       \frametitle{Content}
       \tableofcontents[currentsection]
   \end{frame}%\note{Section begin}
}
\section{Introduction}
\golemparameters
\tokamaktodo
\ExpSetupPTXII
\section{Experimental setup}
\engineerinschemeGolemNewXI
\GolemChamber
\Transformator
\engineerinschemeGolemENPreionVacGas
\engineerinschemeGolemENcircuitB
\engineerinschemeGolemENcircuitCDBD
\engineerinschemeGolemENcircuitST
\trigerseq
\GolemDAS
\section{Golem discharge}
\GolemPlasma
\GolemDischarge
\engineerinschemeGolemNewXInote
\section{(Remote) operation of the GOLEM tokamak}
\RealControlRoom
\shotwww
\OperationLimits
\DataAccess
\section{Conclusion}
\ackGOMTRAIC
\FinalGOMTRAIC
\references
\end{document}
}
