\include{base/defs}
\head


\def\slide#1#2#3{\begin{frame}[label=#1]\frametitle{#2} #3\end{frame}}
\def\Hheslo#1{\centering{\Huge \bf {#1}}}
\def\Lheslo#1{\centering{\Large \bf {#1}}}
\newcommand{\incl}[1]{#1}
\newcommand{\nincl}[1]{#1}

\begin{document}
\title{The GOLEM tour}
\author{Vojt\v{e}ch Svoboda \& the GOLEM team}
\date{\today}   
\slide{title}{The GOLEM document collection}{\titlepage}
\toc

\AtBeginSection[]
{
   \begin{frame}
       \frametitle{Content}
       \tableofcontents[currentsection]
   \end{frame}\note{Section begin}
}
\section{Introduction}
\golemparameters
\GOLEM
\CompassGolemHistory
\tokamaktodo
\engineerinschemeGolemNewXI
\ExpSetupPTXII
\section{Overviews}
\GolemTokamakRealSouthFebXII
\GolemTokamakRealSouthFebXIIdescr
\GolemTokamakRealNorthFebXII
\GolemTokamakRealNorthFebXIIdescr
\InfraRoom
\InfraRoomdescr
\section{Ports}
\GlowDischEl
\GlowDischElIn
\ExilimFXImII
\photodiodes
\InterferometryI
\IPcameraChamber
\ExilimFXImI
\SpectroscopyFiberPort
\RakeProbePort
\RakeProbeXII
\SouthBottomPort
\InterferometryII
\MirnovCoils
\VacuumStandPort
\GasInjectionPort
\VacantNW4
\VacantNB
\VacuumGaugePreionizationGun
\section{Data acquisition system}
\DASbasic
\DASturbo
\DASpapouchSt
\section{Vacuum management system}
\VacuumManag
\VacuumStand
\VacuumGauge
\RotaryPump
\VacCapControlSystem
\section{Gas management system}
\GasManag
\Wgas
\GasInjection
\section{Preionization}
\PreionScheme
\PreionizationGunPure
\VacuumGaugePreionizationGun
\PreionPowSour
\section{Energetics infrastructure}
\EngScheme
\IIkVanThyristorsBDandST
\ThyristorsBandCD
\ChargingResistor
\CapacitorsB
\CapacitorsCD
\CapacitorsBD
\CapacitorsST
\VacCapControlSystem
\section{Control system}
\PSControlSystem
\BasControlSystem
\section{Others}
\GlowDischarge
\HTScryostat
\VIPboard
\OldChamber
\section{Conclusion}
\ackGOMTRAIC
\FinalGOMTRAIC

\references
\end{document}
}
