\documentclass[a4paper,10pt]{article} 
\usepackage[cm]{fullpage}
%\usepackage[backend=biber]{biblatex}

%\addbibresource{refs1}



%\newcommand{\docroot}[1]{../../}
\newcommand{\docroot}[1]{/home/svoboda/mnt/buon/GW/Education/GMinstructions/base/}
\input{\docroot{}../extracts/commons}
\setlength\itemsep{0.2em}

\usepackage{enumitem}
\setlist{nosep}


\begin{document}

\noindent\large{\bf{Úloha 13\hspace{129mm}         02PRA2
\hspace{129mm}Fyzikální praktikum II}}
\vspace{5mm}

\begin{center}
 \noindent\Large{\bf{Magnetic confinement of high temperature plasma at the GOLEM tokamak}}       
\end{center}

\noindent{\bf Abstract:}  The instructions present an introduction to the physics, technology, diagnostics  and operation of the (GOLEM) tokamak. 
The purpose of the measurement is to demonstrate the very basics of tokamak
operation, and to demonstrate the basic scaling properties of magnetic confinement.

\section{Tools}
\LinkToResource{Miscellaneous}{Misc:tools4KFpraktika}

\section{Tasks}
\begin{enumerate}
\taskitem{Homework:RemoteDataManipulation}
\taskitem{HandsOn:BasicLabIntro}
\taskitem{HandsOn:InstallBasicDiagn}
\taskitem{HandsOn:Calibration}
\taskitem{TauExxBt}
\end{enumerate}


\section{Theoretical introduction}

\subsection{Tokamak (GOLEM)}
\LinkToResource{Introduction}{BasicTokamakMission}

\golempart{TokamakGOLEMconcept}

\golempart{TokamakGOLEMparametersFlow}

\theorypart{theory:confinementTimeOverview}

\subsection{Plasma heating power $P_{OH}$}
\theorypart{theory:PlasmaHeatingPower}
\diagnosticspart{diagnostics:currentDrive}
\theorypart{theory:plasmaResistanceSimple}

\subsection{Central electron temperature $T_{e0}$}
\theorypart{theory:CentralElectronTemperature}

\subsection{Thermal plasma energy  $W_{p}$}
\theorypart{theory:PlasmaTotalEnergy}
\theorypart{theory:powerBalance}

\subsection{Energy confinement time $\boldsymbol{\tau_E}$}
\theorypart{theory:tauE}

\section{Experimental Setup}
\subsection{The GOLEM tokamak - technological scheme}
\golempart{ExperimentalSetup}

\subsection{Discharge procedure}
\label{sec:discharge-procedure}

\golempart{dischargeProcedure}


\subsection{The GOLEM tokamak diagnostics}
\diagnosticspart{Diagnostics}


\subsection{Remote Control}
\label{part:remote-interface}
\golempart{RemoteControl}


\section{Measurement procedure, method of evaluation}
\methodpart{Procedure}


\section{Acknowledgments and feedback}
The invaluable effort of the following individuals in preparing this exercise
is deeply appreciated (alphabetic order): Ondřej Ficker, Ondřej Grover, Remy
Guirlet, Jaroslav Krbec, Gergo Pokol, Jan St\"ockel and Milos Vlainic.

If you, the reader, wish to add your name to this list, send us your feedback to
\url{svoboda@fjfi.cvut.cz}. Especially useful and constructive feedback will be
appropriately rewarded.



\nocite{brotankova}
%\bibliographystyle{alphadin}
\bibliographystyle{unsrt}
\bibliography{\docroot{}../extracts/references}
\end{document} 
