\def\GW{/GW}
\def\visibility{true}
\input{\GW/root/GW4reports/GWlatexBeamerHead.tex}

\def\EventSpecific{}

\AtBeginSection[]
{
  \begin{frame}
    \frametitle{Table of Contents}
    \tableofcontents[currentsection]
  \end{frame}
}

\AtBeginSubsection[]
{
  \begin{frame}
    \frametitle{Table of Contents}
    \tableofcontents[currentsubsection]
  \end{frame}
}


\begin{document}

%\GWinput{Presentations/Miscellaneous/17Islamabad/common.tex}\forew


\title{The tokamak GOLEM \\ (...for fusion education )\\ The tokamak GOLEM technology}
\author{Vojt\v{e}ch Svoboda \\ on behalf of the tokamak GOLEM team 
}

\slide{Title}{\titlepage}

\GWis{Tokamak/ExperimentalSetup/GlobalSetup}
\GWFigSlide{The global session flowchart}{0.4}{Tokamak/Handling/TheDaySession/Flowchart/drawing.pdf}

\GWsectionColl{Basic technology tour}{GWio}{Presentations/Commons/Collections/GOLEMtechnologyTour}

\IOsection{The control strategy}{GWio}{
\GWis{Infrastructure/ControlSystem/Strategy}
\GWis{HW/IT/Papouch/QUIDO/ETH8|8}
\GWis{HW/IT/Papouch/AD4ETH}
\GWis{HW/IT/Papouch/GNOME232}
\GWFigSlide{$E_t$}{0.45}{Infrastructure/ControlSystem/PG/2016-10-25_14-35-42_w.jpg}
\GWFigSlide{$B_t$}{0.45}{Infrastructure/ControlSystem/PG/2016-10-25_14-36-37_w.jpg}
\GWFigSlide{Vacuum}{0.45}{Infrastructure/ControlSystem/PG/2016-10-25_14-37-44_w.jpg}
\GWFigSlide{Power supply}{0.45}{Infrastructure/ControlSystem/PG/2016-10-25_14-40-40_w.jpg}
\GWFigSlide{DAS systems}{0.45}{Infrastructure/ControlSystem/PG/2016-10-25_14-54-33_w.jpg}
\GWFigSlide{Main control system}{0.45}{Infrastructure/ControlSystem/PG/2016-10-25_14-57-55_w.jpg}
}

\GWsectionColl{Engineering scheme}{GWio}{Presentations/Commons/Collections/ScenarioToDischarge/Detailed}

\IOsection{Density measurements}{GWio}{
\GWFigSlide{Interferometer Scheme}{1}{Diagnostics/Basic/ElectronDensity/docum/15LM_DiplTh/castor_scheme.png}
\GWFigSlide{Photo of the interferometer}{1}{Diagnostics/Basic/ElectronDensity/docum/15LM_DiplTh/final.jpg}
\GWFigSlide{Dispersion line}{0.5}{Diagnostics/Basic/ElectronDensity/docum/15LM_DiplTh/dispersion_line.jpg}
\GWFigSlide{Text book plasma \#12529}{0.7}{ShowRooms/PlasmaPerformance/TextBookPlasma/12529/basdiag.pdf}
}

\IOsection{Feedback Stabilization}{GWio}{
\GWis{Infrastructure/Stabilization/Scheme}
\begin{frame} \frametitle{Pre-defined waveform - off-line stabilization}
\begin{center}
\GWig{width=0.6\textwidth}{Infrastructure/Stabilization/ShowRoom/15JK/PreDef16690.pdf}\\
\GWig{width=0.6\textwidth}{Infrastructure/Stabilization/ShowRoom/15JK/dz_camera.png}
\end{center}
\end{frame} 
\begin{frame} \frametitle{Feedback coefficient waveform - on-line stabilization}
\bc
\GWig{width=0.7\textwidth}{Infrastructure/Stabilization/ShowRoom/15JK/FX1_16852_WO_CorrectedRGB.pdf}\\
\GWig{width=0.7\textwidth}{Infrastructure/Stabilization/ShowRoom/15JK/FX1_16853_W_CorrectedRGB.pdf}
\ec
\end{frame} 
}

\GWsectionColl{Basic diagnostics}{GWio}{Presentations/Commons/Collections/BasicDiagnostics}

\GWsectionColl{Data handling}{GWtrue}{Presentations/Commons/Collections/TokamakGOLEMdatahandling}



%\closings

\GWis{Presentations/Commons/Closings/SpecificClosings/MarianskaDila/2016}





\end{document}



