% /GW/Presentations/GlobalOverviews/Training
% POZOR! Turin 18 neslo vubec stahnout. Hlasilo network error. Nevim, jestli pomuze zmensit a pro download vypustit blbosti jako starter a below line sekci.
% POZOR, Default k jejich stahovani MUSI byt bez videi (ted NENI)


\def\GW{/GW}
\def\visibility{true}
\input{\GW/root/GW4reports/GWlatexBeamerHead.tex}


\AtBeginSection[]
{
  \begin{frame}
    \frametitle{Table of Contents}
    \tableofcontents[currentsection,hideallsubsections]
  \end{frame}
}

\AtBeginSubsection[]
{
  \begin{frame}
    \frametitle{Table of Contents}
    \tableofcontents[currentsection,hideothersubsections]
  \end{frame}
}



\begin{document}

\title{Introduction to the tokamak operation \\ (GOLEM specific) - Level 1}
\author{Vojt\v{e}ch Svoboda \\ on behalf of the tokamak GOLEM team
\\ for {\bf GOMTRAIC} training session}

\date{2019-03-04}

\slide{Title}{\titlepage}

\section{Introduction}

\GWincl{\visibility}{\GWinput{Education/GMpresConJoints/Bodies/TheGolemTokamak/latexsrc.page}\GWslide}

% Bud
%\GWis{Handling/Controll/StandardUser/RemoteControl/Slides/JKStandardWithShotOffer}
%\IOslide{Session coordinates}{GWio}{
%\begin{block}{Web address:}http://golem.fjfi.cvut.cz/GOMTRAIC_\end{block}
%\begin{center}
%\includegraphics[width=0.5\textwidth]{qrcode.jpg}
%\end{center}
%}
% Anebo
%\GWis{Handling/Controll/StandardUser/RemoteControl/Slides/JKStandard}
\GWis{Handling/Controll/RemoteControl/Slides/OGControllRoomIntroduction}

%\GWis{Handling/DataAccess/ShotHomepage}


\GWsectionColl{Data handling @ the Tokamak GOLEM}{GWio}{Handling/TourDePlace}

%\GWsectionColl{The Electron energy confinement time calculation}{GWtrue}{Education/ExperimentMenu/1stLevelBasic/ElectronEnergyConfinementTime}

\section{Conclusion}

\GWis{Tokamak/ExperimentalSetup/GlobalSetup}
%\ImageFrameFromMetainfo{Tokamak/Introduction/GlobalSetup}
%\ImageFrameFromMetainfo{Operation/AccessingData/ShotHomepage}

\IOslide{Production}{GWio}{
\begin{minipage}{0.49\textwidth}
\begin{itemize}
 \item Everything via \url{http://golem.fjfi.cvut.cz/GOMTRAIC_}
 \begin{itemize}
 \item This presentation
  \item Control rooms 
  \item Contact: Vojtech Svoboda, +420 737673903, svoboda@fjfi.cvut.cz
  \item Chat: tokamak.golem@gmail.com or skype: tokamak.golem
 \end{itemize}
 \end{itemize}
\end{minipage}
\begin{minipage}{0.49\textwidth}
\includegraphics[width=\textwidth]{qrcode.jpg}
\end{minipage}
}

\GWis{Handling/Controll/RemoteControl/Slides/OGControllRoomWithBasicInfo}
\GWis{Education/GMpresConJoints/Closings/ThankYouThreeStagesOfTokamakGOLEM}

%\GWinput{SW/DataAccess/SlidesDefs.page}\ConclAppeal
\GWis{Production/Acknowledgment/2018}

%\GWis{Presentations/Commons/Closings/SpecificClosings/MarianskaDila/2016}

\IOsection{Appendix}{GWtrue}{
\nocite{FusenEngDes11}
\nocite{BrotancePhD}
\nocite{wwwgolem}
\nocite{Wesson:2004}
\begin{frame}[allowframebreaks] \frametitle{References}
\bibliographystyle{unsrt}
\bibliography{/GW/root/bibtex/golem,/GW/root/bibtex/others}
\end{frame}
}


%PRIDAT oblast pro pripadne otazky
% Treba Turin: proc voltage drop, nahradni schema tokamaku %Asi zaremovat pro download, viz vyse
%\GWColl{FAQs}{GWtrue}{TrainingCourses/Production/FAQs}%ZAREMOVANO, viz vyse


%\slide{Just for the case ...}{\blok{Few moments }{from the tokamak GOLEM history}}
%\GWColl{Ender}{GWtrue}{Education/GMpresConJoints/Closings/JustForTheCaseGMhistory}%ZAREMOVANO, viz vyse
%Ma to jeste sve velke mezery .... jukni na to a predelej atraktivneji




%\GWinput{root/PhysicalQuantities/PhysicalQuantitiesDefinitions.tex}
%\slide{Physical Quantities @ the tokamak GOLEM}
%{
%\Ul\Ipch\Ich\Ip\Rp\POH\Wp\Rch\Te\tauE
%\Ip
%\GWpqvdef{Tokamak/Plasma/Volume}\\
%\GWpqvdef{Diagnostics/Basic/PlasmaPlusChamberCurrent/RogowskiCoil/Calibration}\\file:///GW/Presentations/Commons/Collections/TokamakGOLEMoperation/latexsrc.page
%\GWpqvdef{Diagnostics/Basic/LoopVoltage/WireLoop/Calibration}\\
%\GWpqvdef{Theory/Physics/Constants/Boltzmann}\\
%}


\end{document}



