

\def\GW{/GW}
%\def\GW{/locgolem/GW}

%\def\visibility{false}
\def\visibility{true}

\def\vis#1{#1} %or \vison{}  
\def\vis#1{} %\visoff{}

\def\alias{Alias}
\def\forthe{ForThe}



%\def\GWinclMovie{0}


\input{\GW/root/GW4reports/GWlatexBeamerHead.tex}
%\def\GWinclMovie{0} % Bacha, videl jsem movie pouze na okularu, a je to {2}!


\AtBeginSection[]{  
    \begin{frame} 
    \frametitle{Table of Contents}
    \tableofcontents[currentsection,hideallsubsections]
  \end{frame}}

\AtBeginSubsection[]{
  \begin{frame}
    \frametitle{Table of Contents}
    \tableofcontents[currentsection,hideothersubsections]
  \end{frame}}


\begin{document}

\title{Introduction to the tokamak GOLEM operation \\ Practical guide}
\author{Vojt\v{e}ch Svoboda \\ on behalf of the tokamak GOLEM team
\\for \forthe 
%\\ PurposeToBeIncluded
}

%\date{DateToBeIncluded \today}
\date{\today}


\slide{Title}{\titlepage}

\vison{
\section{Introduction}
\GWis{root/GW4reports/ConJoints/Openings/Milestones}
\GWis{root/GW4reports/ConJoints/Intros/EducationKeyToSuccess}
\GWis{root/GW4reports/ConJoints/Openings/GOLEMstart}
\GWis{Tokamak/BasicDescription/ParametersWithPhoto}
\GWis{root/GW4reports/ConJoints/Intros/WikiOldestTokamak}
\GWis{History/GolemCompassHistory}
\GWis{root/GW4reports/ConJoints/Openings/GolemStory/GOLEMvII}
\GWis{Tokamak/ExperimentalSetup/GlobalSetup}
\GWis{root/GW4reports/ConJoints/Openings/GolemMission}
%\GWis{Education/ExperimentMenu/1stLevelBasic/ElectronEnergyConfinementTime/TheStory/Intro/Together}
%\GWis{Theory/Fusion/LawsonCrit/BasicDerivation}
%\GWis{root/GW4reports/ConJoints/Openings/GolemVsITER}
}

\def\Production{
\slide{Production}{
\begin{minipage}{0.49\textwidth}
\begin{itemize}
 \item Everything via \url{http://golem.fjfi.cvut.cz/\alias}
 \begin{itemize}
 \item This presentation
  \item Control rooms 
  \item Contact: Vojtech Svoboda, +420 737673903, vojtech.svoboda@fjfi.cvut.cz
    \item Videoconference: \href{https://meet.google.com/hnv-qjhu-xvi}{https://meet.google.com/hnv-qjhu-xvi}
 \end{itemize}
 \end{itemize}
\end{minipage}
\begin{minipage}{0.49\textwidth}
\includegraphics[width=\textwidth]{qrcode.jpg}
\end{minipage}
}}
\Production

\vison{
\section{The Tokamak (GOLEM)}
\GWis{Theory/Tokamaks/BasicConcept/Sketch.en}
\GWis{Theory/Tokamaks/BasicConcept/Sketch.golem}
\subsection{The GOLEM tokamak concept}
%\GWis{Tokamak/BasicDescription/TokamakGOLEMconcept}
\GWis{Tools/VirtualModels/TatOko_OG/SunInTheLabMovie}
\GWis{Tokamak/Plasma/PlasmaRingMovie}
\GWis{Tokamak/VacuumVessel/ChamberMovie}
\GWis{Tokamak/ToroidalMagneticFieldCoils/MovieSlide}
\GWis{Tokamak/Transformer/MovieSlide}
\GWis{Tokamak/Overview/MovieSlide}
\subsection{The GOLEM tokamak - guide tour}
\GWis{Tokamak/BasicDescription/GOLEMtechnologyTour}
}

\subsection{The scenario to make the (GOLEM) tokamak  discharge}
\GWis{Tokamak/Plasma/ScenarioToDischarge/Basic}
\GWis{Handling/Control/RemoteControl/Slides/OGControlRoomWorkingGasArrows}

\subsection{The scenario to discharge virtually}
\GWis{Tokamak/Plasma/VirtualModelScenarioToDischarge}


\vison{
\subsection{The GOLEM tokamak basic diagnostics}
\GWis{Diagnostics/Basic/BasicScheme}
\GWis{Education/ExperimentMenu/Slides/Oscilloscope}
%\GWis{HW/LaboratoryInstruments/Oscilloscopes/Tektronix/MSO56_350MHz_6p25GS_62p5M}
\GWin{Diagnostics/Basic/BasicScheme/NumProcess}
\ShotHomepage
\RawData
\GitLab
\JupNb
\GWis{Diagnostics/Basic/LoopVoltage}
\GWis{Diagnostics/Basic/LoopVoltage/NumProcess}
\GWis{Diagnostics/Basic/ToroidalMagneticField}
\GWis{Diagnostics/Basic/ToroidalMagneticField/NumProcess}
\GWis{Diagnostics/Basic/ChamberPlusPlasmaCurrent}
\GWis{Diagnostics/Basic/ChamberPlusPlasmaCurrent/NumProcess}
\GWis{Diagnostics/Basic/VisibleRadiation}
\GWis{Diagnostics/Basic/ElectronDensity/Slides/Scheme}
\GWis{Diagnostics/Basic/ElectronDensity/Slides/PhotoGallery}
\GWis{ShowRooms/PlasmaPerformance/TextBookPlasma/\LastWellExecutedShot}
\GWis{Handling/DataAccess/ShotHomepage/40631}
}  


\vison{
\section{The Tokamak GOLEM (remote) operation }
\subsection{Control room}
\GWis{Handling/Control/RemoteControl/Slides/OGControlRoomWorkingGasArrows}
\GWin{Handling/Control/RemoteControl/Tabs/vOG}\GWslidesAll
\GWis{Handling/DataAccess/ShotHomepage/40631}
%\GWis{Handling/DataAccess/ShotHomepage/40032}
}

\subsection{Data handling @ the Tokamak GOLEM}
\GWis{Handling/DataAccess/DataFiles}
%\GWis{Handling/DataAccess/Survey}
\GWis{Handling/DataAccess/Basics}
\GWis{Handling/CompAlgSystems4Golem/python/v3/Jupyter/Demos}
\GWis{Handling/CompAlgSystems4Golem/matlab/Demos}
\GWis{Handling/CompAlgSystems4Golem/octave/Demos}
\GWis{Handling/CompAlgSystems4Golem/gnuplot/Demos}
\GWis{Handling/DataAccess/SWtools/wget}
\GWis{Handling/CompAlgSystems4Golem/excel}




\vison{
\section{The Electron energy confinement time calculation (rough estimation)}
\GWis{Education/ExperimentMenu/1stLevelBasic/ElectronEnergyConfinementTime/TheStory/Intro/HS_house}
\GWis{Education/ExperimentMenu/1stLevelBasic/ElectronEnergyConfinementTime/TheStory/Intro/EnergyBalanceGraph}
\GWis{Education/ExperimentMenu/1stLevelBasic/ElectronEnergyConfinementTime/TheStory/EnergyConfinementTime}
\GWis{ShowRooms/PlasmaPerformance/TextBookPlasma/12529/Quasistationary}
\GWis{Education/ExperimentMenu/1stLevelBasic/ElectronEnergyConfinementTime/TheStory/HeatingPower}
\GWis{Education/ExperimentMenu/1stLevelBasic/ElectronEnergyConfinementTime/TheStory/PlasmaEnergy}
\GWis{Education/ExperimentMenu/1stLevelBasic/ElectronEnergyConfinementTime/TheStory/CentralElectronTemperatureSpitzerFormula}
\GWis{Education/ExperimentMenu/1stLevelBasic/ElectronEnergyConfinementTime/FlowChartSimple}
\GWis{Diagnostics/Standard/Scheme}
\GWis{Education/ExperimentMenu/Slides/Oscilloscope}
\GWis{Diagnostics/Basic/ElectronDensity/Slides/PhotoGallery}
\GWis{Education/ExperimentMenu/Slides/BasicFigs}
\GWis{ShowRooms/PlasmaPerformance/Vacuum_Plasma/Plasma22820vsVacuum22819/fig/Ul}
}

\visoff{
\GWis{Theory/PlasmaDiagnostics/ElectromagneticMeasurements/SchematicIntro}
\GWis{Theory/PlasmaDiagnostics/ElectromagneticMeasurements/PlasmaChamberCurrent}
\GWis{Theory/PlasmaDiagnostics/ElectromagneticMeasurements/MagneticMeasurementsGenerally}
\GWis{Education/Training/MagneticMeasurementsDemo}
}

\vison{
\section{Conclusion}
\GWis{Tokamak/ExperimentalSetup/GlobalSetup}
\Production
\GWis{Handling/Control/RemoteControl/Slides/OGControlRoomWithBasicInfo}
\GWis{root/GW4reports/ConJoints/Closings/Fee}
\GWis{Production/Acknowledgment/2020}
\GWis{root/GW4reports/ConJoints/Closings/ThankYouThreeStagesOfTokamakGOLEM}
}
\vison{
\section{Appendix}
\nocite{FusenEngDes11}
\nocite{BrotancePhD}
\nocite{wwwgolem}
\nocite{Wesson:2004}
\begin{frame}[allowframebreaks] \frametitle{References}
\bibliographystyle{unsrt}
\bibliography{\GW/root/bibtex/golem,\GW/root/bibtex/others}
\end{frame}
}

\visoff{
\GWis{Chronicle/TimeLine/0160TM1}
\GWis{Chronicle/TimeLine/0101CASTOR}
\GWis{Chronicle/TimeLine/1207Transport}
\GWis{Chronicle/TimeLine/0709FirstPlasma}
\GWis{Chronicle/TimeLine/0909TokamakAndTokamak}
\GWis{Chronicle/SpecialGuests/1111Barish}
\GWis{Chronicle/Misc/0516YoungestOperatorAdam}
\GWis{Chronicle/SpecialGuests/0916BB}
\GWis{Events/ABCday/Model}
\GWis{Chronicle/Tokamaks/FTTF@Marianska/10}
\GWis{Chronicle/Tokamaks/FTTF@Marianska/11}
\GWis{Chronicle/Tokamaks/FTTF@Marianska/16}
\GWis{Chronicle/Tokamaks/FTTF@Marianska/17}
\GWis{Chronicle/Smiles/1015TrojskyKun20k}
\GWis{Chronicle/TimeLine/1117MappingNnJ}
\GWis{Chronicle/Statistics/OveralPlasmaLife/1112}
%\GWisp{Chronicle/Smiles/0916Reholnice}\TheGod
}



\end{document}



