\def\GW{/GW}
\def\visibility{true}
\input{\GW/root/GW4reports/GWlatexBeamerHead.tex}

\AtBeginSection[]
{
  \begin{frame}
    \frametitle{Table of Contents}
    \tableofcontents[currentsection]
  \end{frame}
}



\begin{document}

\title{Introduction to the tokamak operation \\ (GOLEM specific) - Level 1}
\author{Vojt\v{e}ch Svoboda \\ on behalf of the tokamak GOLEM team
\\ for the Dec, the 12$^{th}$ event @ Torino politecnico,  2$^{nd}$ edition 
\\ http://golem.fjfi.cvut.cz/torino OR http://goo.gl/diBCy8}

\slide{Title}{\titlepage}

\GWColl{Starter}{GWio}{Presentations/Commons/Collections/TRAICopeninigs}

\GWis{Presentations/Commons/Openings/SimplificationAlert}

\GWsectionColl{The tokamak GOLEM - introduction}{GWio}{Presentations/Commons/Collections/GOLEMintro}

\GWsectionColl{The tokamak (GOLEM) concept}{GWio}{Presentations/Commons/Collections/TokamakGOLEMconcept}

\GWsectionColl{The scenario to make the tokamak (GOLEM) discharge}{GWio}{Presentations/Commons/Collections/ScenarioToDischarge/Basic}

\GWsectionColl{The scenario to discharge virtually}{GWio}{Presentations/Commons/Collections/VirtualModelScenarioToDischarge}

%\GWsectionColl{The Tokamak GOLEM - engineering scheme}{GWtrue}{Presentations/Commons/Collections/EngineeringTourGOLEM}

\GWsectionColl{Tokamak GOLEM - guide tour}{GWio}{Presentations/Commons/Collections/GOLEMtechnologyTour}

\GWsectionColl{Tokamak GOLEM - basic diagnostics}{GWio}{Presentations/Commons/Collections/BasicDiagnostics}

\GWsectionColl{Tokamak GOLEM - operation}{GWio}{Presentations/Commons/Collections/TokamakGOLEMoperation}

\GWsectionColl{Data handling @ the Tokamak GOLEM}{GWio}{Presentations/Commons/Collections/TokamakGOLEMdatahandling}

\GWsectionColl{The Electron energy confinement time calculation}{GWtrue}{Presentations/Commons/Collections/ElectronEnergyConfinementTime}

\section{Conclusion}

\GWis{Tokamak/ExperimentalSetup/GlobalSetup}
%\ImageFrameFromMetainfo{Tokamak/Introduction/GlobalSetup}
%\ImageFrameFromMetainfo{Operation/AccessingData/ShotHomepage}


\IOslide{Production}{GWio}{
\begin{itemize}
 \item Everything via \url{http://golem.fjfi.cvut.cz/torino}
 \begin{itemize}
 \item This presentation
  \item Control rooms 
  \item Contact: Vojtech Svoboda, +420 737673903, 
  \item Chat: tokamak.golem@gmail.com or skype: tokamak.golem
 \end{itemize}
 \end{itemize}
}


%\GWinput{SW/DataAccess/SlidesDefs.page}\ConclAppeal
\GWinput{Presentations/Commons/Acknowledgements/Acknowledgements/latrexsrc.page}\ackXIV

%\GWis{Presentations/Commons/Closings/SpecificClosings/MarianskaDila/2016}

\IOsection{Appendix}{GWtrue}{
\nocite{FusenEngDes11}
\nocite{BrotancePhD}
\nocite{wwwgolem}
\nocite{Wesson:2004}
\begin{frame}[allowframebreaks] \frametitle{References}
\bibliographystyle{unsrt}
\bibliography{/GW/root/bibtex/golem,/GW/root/bibtex/others}
\end{frame}
}

\slide{Just for the case ...}{\blok{Few moments }{from the tokamak GOLEM history}}
\GWColl{Starter}{GWtrue}{Presentations/Commons/Collections/TokamakGOLEMhistory}

%\GWinput{root/PhysicalQuantities/PhysicalQuantitiesDefinitions.tex}
%\slide{Physical Quantities @ the tokamak GOLEM}
%{
%\Ul\Ipch\Ich\Ip\Rp\POH\Wp\Rch\Te\tauE
%\Ip
%\GWpqvdef{Tokamak/Plasma/Volume}\\
%\GWpqvdef{Diagnostics/Basic/PlasmaPlusChamberCurrent/RogowskiCoil/Calibration}\\file:///GW/Presentations/Commons/Collections/TokamakGOLEMoperation/latexsrc.page
%\GWpqvdef{Diagnostics/Basic/LoopVoltage/WireLoop/Calibration}\\
%\GWpqvdef{Theory/Physics/Constants/Boltzmann}\\
%}


\end{document}



