\def\GW{/GW}\def\visibility{true}
%USAGE
%~~~~~~~~~~~~~~~~~~~~
%\def\GW{/home/svoboda/GOLEM/GWlocal}
%\input{\GW/root/Commons/Latex/Presentations/basic.tex}
%~~~~~~~~~~~~~~~~~~~~

\documentclass[]{article}

\input{\GW/root/GW4reports/GWcommons}

\usepackage[a4paper, margin=2cm,portrait]{geometry}\begin{document}
%info@http:://golem.fjfi.cvut.cz/wiki/root/GW4reports

\def\title{Basic characteristics}

\def\default{
\begin{itemize}
\setlength{\itemsep}{-5pt}
\item\GWPhysQuantValueWithNameAndUnits{Tokamak/VacuumVessel/TechnologicalQuantities/MajorRadius}
\item\GWPhysQuantValueWithNameAndUnits{Tokamak/VacuumVessel/TechnologicalQuantities/MinorRadius}
\item\GWPhysQuantValueWithNameAndUnits{Discharge/Plasma/PlasmaMinorRadius}
\item\GWPhysQuantValueWithNameAndUnits{Discharge/Plasma/PlasmaCurrent/Maximum}
\item\GWPhysQuantValueWithNameAndUnits{Discharge/Plasma/EffectiveIonCharge}
\item\GWPhysQuantValueWithNameAndUnits{Diagnostics/Standard/ToroidalMagneticField/Maximum}
\item\GWPhysQuantValueWithNameAndUnits{Diagnostics/Standard/ElectronDensity}
\item\GWPhysQuantValueWithNameAndUnits{Discharge/Plasma/ElectronTemperature/Maximum}
\item\GWPhysQuantValueWithNameAndUnits{Diagnostics/Standard/IonTemperature/Maximum}
\item\GWPhysQuantValueWithNameAndUnits{Discharge/Plasma/TimeParameters/DischargeLength/Maximum}
\item\GWPhysQuantValueWithNameAndUnits{Diagnostics/Standard/EnergyConfinementTime/Typical}
\end{itemize}
}
{\Large\bf \title}\newline\default\references\end{document}
