\start{basic}\GWinput{root/PhysicalQuantities/pSQL2GW/tex/basicTAGGWPhysQuantValueWithName.tex}\konec
\start{diagnostics}\GWinput{root/PhysicalQuantities/pSQL2GW/tex/diagnosticsTAGGWPhysQuantValueWithName.tex}\konec
\start{technology}\GWinput{root/PhysicalQuantities/pSQL2GW/tex/technologyTAGGWPhysQuantValueWithName.tex}\konec
\start{vessel}\GWinput{root/PhysicalQuantities/pSQL2GW/tex/vesselTAGGWPhysQuantValueWithName.tex}\konec
\start{DAS}\GWinput{root/PhysicalQuantities/pSQL2GW/tex/DASTAGGWPhysQuantValueWithName.tex}\konec
\start{infrastructure}\GWinput{root/PhysicalQuantities/pSQL2GW/tex/infrastructureTAGGWPhysQuantValueWithName.tex}\konec
\start{DischargeSetup}\GWinput{root/PhysicalQuantities/pSQL2GW/tex/DischargeSetupTAGGWPhysQuantValueWithName.tex}\konec
\start{plasma}\GWinput{root/PhysicalQuantities/pSQL2GW/tex/plasmaTAGGWPhysQuantValueWithName.tex}\konec
\start{stabilisation}\GWinput{root/PhysicalQuantities/pSQL2GW/tex/stabilisationTAGGWPhysQuantValueWithName.tex}\konec
