\documentclass[varwidth]{standalone}
\def\GWinput#1{\input{/GW/#1}}

\begin{document}
\input{/GW/root/PhysicalQuantities/PhysQuant.tex}
\begin{center}
{\LARGE\bf \input{ActualPhysQuant}}
\end{center}
\end{document}
