\def\GW{/GW}
\def\visibility{true}
\input{\GW/root/GW4reports/GWlatexBeamerHead.tex}

\AtBeginSection[]
{
  \begin{frame}
    \frametitle{Table of Contents}
    \tableofcontents[currentsection]
  \end{frame}
}

\begin{document}

\title{Introduction to the tokamak operation \\ (GOLEM specific) - Level 1}
\author{Vojt\v{e}ch Svoboda \\ on behalf of the tokamak GOLEM team \\ for the TCN event, 1$^{th}$ edition}

\slide{Title}{\titlepage}

\GWsectionColl{Starter}{GWio}{Presentations/Commons/Collections/TRAICopeninigs}

\GWis{Presentations/Commons/Openings/SimplificationAlert}

\GWsectionColl{Introduction - Fusion}{GWio}{Presentations/Commons/Collections/FusionIntroduction}

\GWsectionColl{The tokamak (GOLEM) concept}{GWio}{Presentations/Commons/Collections/TokamakGOLEMconcept}

\GWsectionColl{The tokamak (GOLEM) discharge}{GWio}{Presentations/Commons/Collections/VirtualModelScenarioToDischarge}

\GWsectionColl{The tokamak GOLEM - introduction}{GWio}{Presentations/Commons/Collections/GOLEMintro}

\GWsectionColl{The scenario to make the tokamak (GOLEM) discharge}{GWio}{Presentations/Commons/Collections/ScenarioToDischarge/Basic}



%\GWsectionColl{The Tokamak GOLEM - engineering scheme}{GWtrue}{Presentations/Commons/Collections/EngineeringTourGOLEM}

\GWsectionColl{Tokamak GOLEM - basic diagnostics}{GWtrue}{Presentations/Commons/Collections/BasicDiagnostics}

\GWsectionColl{Tokamak GOLEM - operation}{GWio}{Presentations/Commons/Collections/TokamakGOLEMoperation}

\GWsectionColl{Data handling @ the Tokamak GOLEM}{GWio}{Presentations/Commons/Collections/TokamakGOLEMdatahandling}

\section{Conclusion}
\GWis{Presentations/Commons/Collections/Closings}
%\GWis{Education/ExperimentMenu/ElectronEnergyConfinementTime/Flowchart}
\GWis{Tokamak/ExperimentalSetup/GlobalSetup}
%\ImageFrameFromMetainfo{Tokamak/Introduction/GlobalSetup}
%\ImageFrameFromMetainfo{Operation/AccessingData/ShotHomepage}


\IOslide{Production}{GWio}{
\begin{itemize}
 \item Everything via \url{http://golem.fjfi.cvut.cz/TCN}.
 \item GOLEM wiki: \url{http://golem.fjfi.cvut.cz/wiki}.
 \begin{itemize}
 \item This presentation.
 \item Control rooms. 
 \im Usefull tools.
 \end{itemize}
   \item Mail: vojtech.svoboda@fjfi.cvut.cz
   \im Program 4 TCN
   \bi
     \im Dopo: přednáška
     \im Odpo: vzdálené řízení tokamaku GOLEM  - X skupin. !Pohlednice!
     \im Podvečer: $\mu$prezentace "Co jsme zkusili a co jsme zjistili." + diskuse
   \ei
   \im + Výzva: letní tokamak.
   \im Čtvrtky ..
 \end{itemize}
}


%\GWinput{SW/DataAccess/SlidesDefs.page}\ConclAppeal
\GWinput{Presentations/Commons/Acknowledgements/Acknowledgements/latrexsrc.page}\ackXIV
\GWis{Presentations/Commons/Closings/SpecificClosings/MarianskaDila/2010}
\GWis{Presentations/Commons/Closings/SpecificClosings/MarianskaDila/2011}
\GWslideDP
\GWis{Presentations/Commons/Closings/SpecificClosings/MarianskaDila/2016}
\GWis{Presentations/Commons/Closings/SpecificClosings/MarianskaDila/2017}


\IOsection{Appendix}{GWio}{
\nocite{FusenEngDes11}
\nocite{BrotancePhD}
\nocite{wwwgolem}
\nocite{Wesson:2004}
\begin{frame}[allowframebreaks] \frametitle{References}
\bibliographystyle{unsrt}
\bibliography{/GW/root/bibtex/golem,/GW/root/bibtex/others}
\end{frame}
}


\out{\GWinput{root/PhysicalQuantities/PhysicalQuantitiesDefinitions.tex}
\slide{Physical Quantities @ the tokamak GOLEM}
{
%\Ul\Ipch\Ich\Ip\Rp\POH\Wp\Rch\Te\tauE
\Ip
%\GWpqvdef{Tokamak/Plasma/Volume}\\
%\GWpqvdef{Diagnostics/Basic/PlasmaPlusChamberCurrent/RogowskiCoil/Calibration}\\
%\GWpqvdef{Diagnostics/Basic/LoopVoltage/WireLoop/Calibration}\\
%\GWpqvdef{Theory/Physics/Constants/Boltzmann}\\
}}


\end{document}



