\def\GlowDischElIn{\begin{frame} \frametitle{Glow discharge/Biasing electrode - chamber view}
  \begin{figure}[t]
    \centering
    \includegraphics[width=0.6\textwidth,angle=90]{BiasingElectrodeChamberView.jpg}
  \end{figure}
\end{frame}}
