% Run it: pdflatex  --shell-escape present.tex
\def\GW{/GW}
\input{\GW/root/GW4reports/GWlatexBeamerHead.tex}
\def\IOsection#1#2{\section{#1}#2}


\def\GWig#1#2{
\immediate\write18{wget  --user=golem --password='rabijosille'  http://golem.fjfi.cvut.cz/wiki/#2 -O `echo #2|sed 's/\//@/g'`;}
%\immediate\write18{mkdir -p GW/`dirname #2`;wget  --user=golem --password='rabijosille'  http://golem.fjfi.cvut.cz/wiki/#2 -O `echo #2|sed 's/\//@/g'`;}
\includegraphics[#1]{\GW/#2}
}
\begin{document}

\IOsection{Foreword}{
\GWis{Presentations/Commons/Intros/SpecificOpenings/SunPlasma}
\title{Introduction to tokamak operation \\ (GOLEM specific) - Level 1}
\author{Vojt\v{e}ch Svoboda \\ on behalf of the tokamak GOLEM team \\ for the Dec, the 1st event @ Torino politecnico}
\slide{Title}{\titlepage}
\GWis{Presentations/Commons/Intros/SpecificOpenings/OurMission}
\GWis{Presentations/Commons/Intros/SpecificOpenings/Milestones}
\GWis{Presentations/Commons/Intros/SpecificOpenings/GOLEMstart}}


\IOsection{Introduction}{
\GWis{Tokamak/BasicCharacteristics/ParametersWithPhoto}
\GWis{History/GolemCompassHistory}
\GWis{Tokamak/Introduction/GolemStory}
\GWis{Tokamak/Introduction/GlobalSetup}
\GWinput{Presentations/Commons/Collections/GOLEMtour/latexsrc.page}
}

\IOsection{Tokamak GOLEM - engineering scheme}
{\GWinput{Presentations/Commons/Collections/TokamakPlasmaToDo/latexsrc.page}}

\IOsection{Tokamak GOLEM - basic diagnostics}
{\GWinput{Presentations/Commons/Collections/BasicDiagnostics/latexsrc.page}
\GWis{Handling/DataAccess/ShotGraph}
\GWis{ShowRooms/PlasmaPerformance/Vacuum_Plasma/Plasma10532vs10533Vacuum}
}

\IOsection{Tokamak GOLEM - operation}{
\GWis{Handling/Controll/StandardUser/RemoteControl/Tabs/ControlRoom/DefaultSetup}
\GWis{Handling/DataAccess/ShotHomepage}}


\IOsection{Data handling @ the Tokamak GOLEM}
{
\GWis{Handling/DataAccess/DataFiles}
\GWis{Handling/DataAccess/survey}
\GWis{Handling/DataAccess/Basics}
\GWis{SW/wget}
\GWis{SW/matlab/Demos/\LastWellExecutedShot}
\GWis{SW/jupyter/Demos/\LastWellExecutedShot/Ul}
\GWis{SW/gnuplot/Demos/\LastWellExecutedShot/Ul/script}
\GWis{SW/excel}
}

\IOsection{Estimation of main plasma parameters}{
\GWis{Education/ExperimentMenu/BasicTokamakMeasurements/GlobalStrategy}
\GWis{Diagnostics/Basic/LoopVoltage/BlockDiagram}
\GWis{Education/ExperimentMenu/BasicTokamakMeasurements/PlasmaCurrent/FlowChart}
%\GWis{Education/ExperimentMenu/BasicTokamakMeasurements/PlasmaCurrent}
%\GWis{Education/ExperimentMenu/BasicTokamakMeasurements/CentralElectronTemperatureSpitzerFormula}
%\GWis{Education/ExperimentMenu/BasicTokamakMeasurements/HeatingPower}
%\GWis{Education/ExperimentMenu/BasicTokamakMeasurements/PlasmaEnergy}
}

\IOsection{Closings}{
\GWis{TrainingCourses/Universities/Uni_Torino.it/Production}
\GWis{Tools/VirtualModels/TatOko/gallery}
\GWis{Presentations/Commons/Acknowledgements/2016}
\GWis{Presentations/Commons/Closings/SpecificClosings/MarianskaDila/2016}
}

\IOsection{Appendix}{
\nocite{FusenEngDes11}
\nocite{BrotancePhD}
\nocite{wwwgolem}
\nocite{Wesson}
\begin{frame}[allowframebreaks] \frametitle{References}
\bibliographystyle{unsrt}
\bibliography{/GW/root/golem,/GW/root/others}
\end{frame}
}
\def\PhysQuant#1#2#3{#2:\ #1 [#3]\\}
\def\PhysQuantValue#1#2#3#4{#2:\ #1=#3 [#4]\\}
\GWinput{root/PhysicalQuantities.tex}
\slide{Physical Quantities @ the tokamak GOLEM}
{
\Ul\Ipch\Ich\Ip\Rp\POH\Wp\Rch\Te\tauE
\GWpqvdef{Tokamak/Plasma/Volume}\\
\GWpqvdef{Diagnostics/Basic/PlasmaPlusChamberCurrent/RogowskiCoil/Calibration}\\
\GWpqvdef{Diagnostics/Basic/LoopVoltage/WireLoop/Calibration}\\
\GWpqvdef{Theory/Physics/Constants/Boltzmann}\\
}

\end{document}

  